
We obtain the \h{Makuchowski Twin} as a subset of the
Euclidean plane with the induced topology by attaching the
\g{Locally Connected Fan}
to the \g{end point} of the prolonged segment of the
\g{Prolonged Harmonic Fan}.

Makuchowski twin is a \g{dendroid} where each nonconstant
\g{open} mapping is \g{light}. See \cite[Example 2.1]{makuchowski1994}.
