
To define the \g{Harmonic Shredded Fan} $F_{HS}$ we cut the
'arms' $ve$ in the \g{Harmonic Fan} $F_{H}$ in such a way,
that their lengths run through all rationals in the unit
interval (we do not cut the vertical segment through the
origin). We notice that all Harmonic shredded fans are
homeomorphic.

See \cite[p.31]{ccm1990}.
